From 675f7271642bdddbc008d22678e277c72032bdcd Mon Sep 17 00:00:00 2001
From: Kristóf Marussy <kristof@marussy.com>
Date: Thu, 18 Aug 2022 02:08:21 +0200
Subject: feat(frontend): responsive editor styling

---
 subprojects/frontend/src/TopBar.tsx | 7 +------
 1 file changed, 1 insertion(+), 6 deletions(-)

(limited to 'subprojects/frontend/src/TopBar.tsx')

diff --git a/subprojects/frontend/src/TopBar.tsx b/subprojects/frontend/src/TopBar.tsx
index b414712e..5ad80d40 100644
--- a/subprojects/frontend/src/TopBar.tsx
+++ b/subprojects/frontend/src/TopBar.tsx
@@ -17,12 +17,7 @@ export default function TopBar(): JSX.Element {
       })}
     >
       <Toolbar>
-        <Typography
-          variant="h6"
-          component="h1"
-          flexGrow={1}
-          color={(theme) => theme.palette.text.primary}
-        >
+        <Typography variant="h6" component="h1" flexGrow={1}>
           Refinery
         </Typography>
         <ToggleDarkModeButton />
-- 
cgit v1.2.3-54-g00ecf

