From fa1a7037b47f2e0114d8abc5a99d29239bd3637b Mon Sep 17 00:00:00 2001
From: Kristóf Marussy <kristof@marussy.com>
Date: Sun, 10 Jul 2022 16:07:45 +0200
Subject: refactor: local server import/export
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

Signed-off-by: Kristóf Marussy <kristof@marussy.com>
---
 src/containers/settings/EditSettingsScreen.tsx | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'src/containers/settings/EditSettingsScreen.tsx')

diff --git a/src/containers/settings/EditSettingsScreen.tsx b/src/containers/settings/EditSettingsScreen.tsx
index 8f0884737..0ab3b63cf 100644
--- a/src/containers/settings/EditSettingsScreen.tsx
+++ b/src/containers/settings/EditSettingsScreen.tsx
@@ -33,6 +33,7 @@ import EditSettingsForm from '../../components/settings/settings/EditSettingsFor
 import ErrorBoundary from '../../components/util/ErrorBoundary';
 
 import globalMessages from '../../i18n/globalMessages';
+import { importExportURL } from '../../api/apiBase';
 
 const debug = require('../../preload-safe-debug')('Ferdium:EditSettingsScreen');
 
@@ -894,6 +895,7 @@ class EditSettingsScreen extends Component<EditSettingsScreenProps> {
           }
           openProcessManager={() => this.openProcessManager()}
           isOnline={app.isOnline}
+          serverURL={importExportURL()}
         />
       </ErrorBoundary>
     );
-- 
cgit v1.2.3-54-g00ecf

